                                                                    Date:    August 27, 1995 Sheet     1 of     1

                                                                    Size Document Number REV

                                                                      A A

                                                                    Title

                                                                          CK-118 Thermal Relay Replacement

                                                     P1
                                                    Octal tube base

                                                                                K1
                                                                                275-240
                                                                                 5 V
                                                                           Q1
                                                                           276-1067

                         R4
                         100
                         1/2 W

                                  R5
                                  22
                                  2 W
                R3
                100
                1/2 W

R1
100
1/2 W

        R2
       100
        1/2 W

                                  C1
                                  470

                                         D1

                                        5.1 V

                                                 D2

                                               1N4001

                                                        D3

                                                       1N4001

                                                                D4

                                                              1N4001

                                                                                   Q1

                                                                             C A G

                                                                     This is a solid-state replacement for
                                                                     the Raytheon CK-118 thermal relay
                                                                     as used in AF Amplifier AM-65/GRC

                                                                     Unless otherwise specified:
                                                                     1. Resistances in ohms
                                                                     2. Capacitances in microfarads

                                                                     as relay K1 (Fed Tele & Rad
                                                                     part/dwg #GH-2392-12)

                                                                     Measured trip voltage roughly 7.25 V